Using the Options Menu

The "Options" command allows you to specify:
     the size of your paper,
     how far from the top and left side of the paper to start drawing,
     how wide and tall you want your chart to be,
     the pixel width of the lines used to draw your chart,
     whether to print your chart sideways,
     whether to include the chart file name as part of the print out.

Use the the up arrow and down arrow keys to change the highlighted selection.

Use the <CR> (return) key to select the currently highlighted selection
for update.  Yes/no choices -- the last two items on the list -- simply
toggle with each <CR>.

For numeric options, the old value will disappear either when a <CR> is
typed or when you start typing numbers; the cursor moves to the data entry
area.  You may edit the entire input string with the <CTRL-U> key or single-
character input with the backspace key.  Typing a <CR> indicates when you're
done making changes.  If the value is acceptable, it will be formated and
displayed with decimal point aligned.


Type any key to continue.